<template>
	<fr-svg @click="onClick" :uuid="`fr-icon-stethoscope-${size}${strokeWidth}${theme}${fill}${strokeLinecap}${strokeLinejoin}`" :width="size" :height="size" :isCache="true" :src="iconSvg" />
</template>
<script>
	// #ifdef UNI-APP-X
	import icons from "../../mixins/icons.uts";
	// #endif
	// #ifndef UNI-APP-X
	import icons from "../../mixins/icons.js";
	// #endif
	/**
	 * @description 《听诊器》图标
	 * @tutorial https://www.flowerui.com/documents/flower-icons/icons.html
	 * @property {Number} size 图标大小
	 * @property {Number} strokeWidth 线段粗细
	 * @property {String} theme 图标大小
	 * @property {Array} fill 图标颜色，["外部描边颜色","外部填充颜色","内部描边颜色","内部填充颜色"]
	 * @property {String} strokeLinecap 图标大小
	 * @property {String} strokeLinejoin 图标大小
	 * @event {Function} click 图标点击事件
	 */
	export default {
		mixins: [icons],
		computed: {
			// #ifdef UNI-APP-X
			iconSvg(): string {
			// #endif
			// #ifndef UNI-APP-X
			iconSvg() {
			// #endif
				return `<?xml version="1.0" encoding="UTF-8"?><svg width="${this.size}" height="${this.size}" viewBox="0 0 48 48" fill="none" xmlns="http://www.w3.org/2000/svg"><path d="M21.9474 4V10M10.0526 7H4C4 7 4 16 4 21C4 26 8 32 16 32C24 32 28 26 28 21C28 16 28 7 28 7H21.9474H10.0526ZM10.0526 4V10V4Z" stroke="${this.colors(0)}" stroke-width="${this.strokeWidth}" stroke-linecap="${this.strokeLinecap}" stroke-linejoin="${this.strokeLinejoin}"/><path d="M40 23C42.2091 23 44 21.2091 44 19C44 16.7909 42.2091 15 40 15C37.7909 15 36 16.7909 36 19C36 21.2091 37.7909 23 40 23Z" fill="${this.colors(1)}" stroke="${this.colors(0)}" stroke-width="${this.strokeWidth}" stroke-linecap="${this.strokeLinecap}" stroke-linejoin="${this.strokeLinejoin}"/><path d="M16 32C16 38.6274 21.3726 44 28 44C34.6274 44 40 38.6274 40 32V23" stroke="${this.colors(0)}" stroke-width="${this.strokeWidth}" stroke-linecap="${this.strokeLinecap}" stroke-linejoin="${this.strokeLinejoin}"/></svg>`
			}
		}
	}
</script>