<template>
	<fr-svg @click="onClick" :uuid="`fr-icon-heart-rate-${size}${strokeWidth}${theme}${fill}${strokeLinecap}${strokeLinejoin}`" :width="size" :height="size" :isCache="true" :src="iconSvg" />
</template>
<script>
	// #ifdef UNI-APP-X
	import icons from "../../mixins/icons.uts";
	// #endif
	// #ifndef UNI-APP-X
	import icons from "../../mixins/icons.js";
	// #endif
	/**
	 * @description 《心率》图标
	 * @tutorial https://www.flowerui.com/documents/flower-icons/icons.html
	 * @property {Number} size 图标大小
	 * @property {Number} strokeWidth 线段粗细
	 * @property {String} theme 图标大小
	 * @property {Array} fill 图标颜色，["外部描边颜色","外部填充颜色","内部描边颜色","内部填充颜色"]
	 * @property {String} strokeLinecap 图标大小
	 * @property {String} strokeLinejoin 图标大小
	 * @event {Function} click 图标点击事件
	 */
	export default {
		mixins: [icons],
		computed: {
			// #ifdef UNI-APP-X
			iconSvg(): string {
			// #endif
			// #ifndef UNI-APP-X
			iconSvg() {
			// #endif
				return `<?xml version="1.0" encoding="UTF-8"?><svg width="${this.size}" height="${this.size}" viewBox="0 0 48 48" fill="none" xmlns="http://www.w3.org/2000/svg"><path d="M31.8785 37C29.0529 39.0738 26.2237 40.5872 24 41.3262C17 39 4 29 4 18C4 11.9249 8.92487 7 15 7C18.7203 7 22.0093 8.8469 24 11.6738C25.9907 8.8469 29.2797 7 33 7C39.0751 7 44 11.9249 44 18C44 19.7465 43.6723 21.4677 43.0929 23.1371" stroke="${this.colors(0)}" stroke-width="${this.strokeWidth}" stroke-linecap="${this.strokeLinecap}" stroke-linejoin="${this.strokeLinejoin}"/><path d="M27 29H31L34 25L37 33L39.9625 29H44" stroke="${this.colors(0)}" stroke-width="${this.strokeWidth}" stroke-linecap="${this.strokeLinecap}" stroke-linejoin="${this.strokeLinejoin}"/></svg>`
			}
		}
	}
</script>