-- ============================================================================
-- ylrz_saas 数据库清理 SQL - 需要DBA确认的分区表
-- 生成时间: 2026-05-21
-- 
-- 以下20张表可能是MySQL分区表,需要DBA先确认分区设置再操作
-- 如果确认是非分区普通表,且有分表引用(mapper中有 fs_user_operation_log/qw_msg),
--   则这些可能是历史分表数据,需要评估是否还需要
-- ============================================================================

-- fs_user_operation_log_0~9: mapper中引用的是 fs_user_operation_log
-- 如果 fs_user_operation_log_0~9 是独立分表(非分区),且无代码直接引用,可考虑删除
DROP TABLE IF EXISTS `fs_user_operation_log_0`;
DROP TABLE IF EXISTS `fs_user_operation_log_1`;
DROP TABLE IF EXISTS `fs_user_operation_log_2`;
DROP TABLE IF EXISTS `fs_user_operation_log_3`;
DROP TABLE IF EXISTS `fs_user_operation_log_4`;
DROP TABLE IF EXISTS `fs_user_operation_log_5`;
DROP TABLE IF EXISTS `fs_user_operation_log_6`;
DROP TABLE IF EXISTS `fs_user_operation_log_7`;
DROP TABLE IF EXISTS `fs_user_operation_log_8`;
DROP TABLE IF EXISTS `fs_user_operation_log_9`;

-- qw_msg_0~9: mapper中引用的是 qw_msg
-- 如果 qw_msg_0~9 是独立分表(非分区),且无代码直接引用,可考虑删除
DROP TABLE IF EXISTS `qw_msg_0`;
DROP TABLE IF EXISTS `qw_msg_1`;
DROP TABLE IF EXISTS `qw_msg_2`;
DROP TABLE IF EXISTS `qw_msg_3`;
DROP TABLE IF EXISTS `qw_msg_4`;
DROP TABLE IF EXISTS `qw_msg_5`;
DROP TABLE IF EXISTS `qw_msg_6`;
DROP TABLE IF EXISTS `qw_msg_7`;
DROP TABLE IF EXISTS `qw_msg_8`;
DROP TABLE IF EXISTS `qw_msg_9`;
