<template>
	<view class="container">
		<uni-nav-bar fixed :border="false" :backgroundColor="`rgba(255,255,255,${opacity})`" title="尿酸监测"
			:statusBar="true" left-icon="left" @clickLeft="back"></uni-nav-bar>
		<image class="page-bg" src="@/static/images/pages_watch/images/sleep_top_bg.png" mode="widthFix"></image>
		<view class="container-body">
			<dateTimePicker @onChange="onChangeTime" />
			<!-- 尿酸趋势 -->
			<view class="box">
				<view class="box-title">
					<view class="box-title-left">尿酸趋势</view>
				</view>
				<view class="ytitle" v-show="!loading && !isEmpty">单位：μmol/L</view>
				<view class="echartbox">
					<qiun-data-charts v-show="!isEmpty" type="column" :opts="opts" :chartData="chartData"
						tooltipFormat="uaTooltip" />
					<myEmpty v-show="isEmpty" style="padding: 40rpx 0 0 0;"></myEmpty>
				</view>
				<view class="legend" v-show="!loading && !isEmpty">
					<view class="legend-item">
						<view class="legend-dot" style="background-color: #52D087;"></view><text>150-416μmol/L</text>
					</view>
					<view class="legend-item">
						<view class="legend-dot" style="background-color: #FDBD27;"></view><text>{{'＜'}}150μmol/L</text>
					</view>
					<view class="legend-item">
						<view class="legend-dot" style="background-color: #FF5558;"></view><text>{{'＞'}}416μmol/L</text>
					</view>
				</view>
			</view>
			<!-- 尿酸异常记录 -->
			<view class="box">
				<view class="box-title" style="height: 80rpx;">
					<view class="box-title-left">尿酸异常记录</view>
					<view class="box-title-right" @tap="handleMore">
						查看更多<image src="@/static/images/pages_watch/icons/my_right_arrow_right_icon.png"></image>
					</view>
				</view>
				<view class="abnormal">
					<view class="abnormal-item colorbg1">
						<view class="abnormal-item-title">高风险</view>
						<view class="abnormal-item-num">
							<text>{{status1}}次</text>
							<image src="@/static/images/pages_watch/icons/zyss_arrow_icon1.png"></image>
						</view>
					</view>
					<view class="abnormal-item colorbg2">
						<view class="abnormal-item-title">不良</view>
						<view class="abnormal-item-num">
							<text>{{status2}}次</text>
							<image src="@/static/images/pages_watch/icons/zyss_arrow_icon2.png"></image>
						</view>
					</view>
					<view class="abnormal-item colorbg5">
						<view class="abnormal-item-title">正常</view>
						<view class="abnormal-item-num">
							<text>{{status3}}次</text>
							<image src="@/static/images/pages_watch/icons/zyss_arrow_icon5.png"></image>
						</view>
					</view>
				</view>
				<view class="standard">
					<view class="standard-title">
						<image src="@/static/images/pages_watch/icons/note_icon.png"></image>
						<text>尿酸</text>
						<text>最新标准</text>
					</view>
					<view class="standard-con">
						<view>男性正常值：150~416umol/L</view>
						<view>女性正常值：89~357μmol/L</view>
					</view>
				</view>
			</view>
		</view>
	</view>
</template>

<script>
	import myEmpty from "@/pages_watch/components/myEmpty/myEmpty.vue"
	import dateTimePicker from "@/pages_watch/components/dateTimePicker/dateTimePicker.vue"
	import {
		ualist,
		uaCount
	} from "@/api/pages_watch/healthMonitoring.js";
	export default {
		components: {
			myEmpty,
			dateTimePicker
		},
		data() {
			return {
				opacity: 0,
				loading: true,
				isEmpty: false,
				// 0:正常，1：不良2:高风险
				status1: 0,
				status2: 0,
				status3: 0,
				queryParam: {
					startTime: "",
					endTime: "",
					deviceId: uni.getStorageSync("deviceId")
				},
				chartData: {},
				opts: {
					padding: [15, 0, 15, 0],
					enableScroll: false,
					dataLabel: false,
					legend: {
						show: false
					},
					xAxis: {
						disableGrid: true,
						fontSize: 12,
						axisLine: false,
						fontColor: '#ccc',
						labelCount: 7,
						format: "formatterTime",
					},
					yAxis: {
						gridType: "dash",
						dashLength: 2,
						data: [{
							fontColor: '#ccc',
							min: 0,
							// max: 100,
							axisLine: false,
							fontSize: 12,
						}]
					},
					extra: {
						tooltip: {
							gridType: "dash",
							showArrow: false,
							legendShow: true,
							legendShape: "circle"
						},
						column: {
							type: "group",
							width: 12,
							barBorderRadius: [4, 4, 0, 0],
						}
					}
				}
			}
		},
		methods: {
			back() {
				uni.navigateBack({
					delta: 1
				})
			},
			onChangeTime(time) {
				const param = {
					startTime: this.$timeFormat(time[0], 'yyyy/mm/dd hh:MM:ss'),
					endTime: this.$timeFormat(time[1], 'yyyy/mm/dd hh:MM:ss'),
					deviceId: uni.getStorageSync("deviceId") || ""
				}
				this.queryParam = param
				this.getServerData(param)
				this.getCount(param)
			},
			getServerData(param) {
				this.loading = true
				ualist(param).then((res) => {
					this.loading = false
					this.isEmpty = !(res.data && res.data && res.data.length > 0)
					if (res.code == 200 && res.data) {
						let chartData = {
							categories: res.data.map(item => item.createTime),
							series: [{
								name: "尿酸",
								data: res.data.map(item => ({
									value: item.val,
									color: item.status === 1 ? "#FDBD27" : item.status ===
										2 ? "#FF5558" : "#52D087"
								}))
							}]
						}
						this.chartData = JSON.parse(JSON.stringify(chartData));
					} else {
						this.avg = undefined
						this.max = undefined
						this.min = undefined
					}
				}).catch((err) => {
					this.loading = false
				});
			},
			getCount(param) {
				this.status1 = 0
				this.status2 = 0
				this.status3 = 0
				uaCount(param).then((res) => {
					if (res.code == 200 && res.data && res.data.length > 0) {
						// 0:正常，1：偏低2:偏高
						res.data.forEach(item => {
							this.status1 += item.status == 2 ? item.count : 0
							this.status2 += item.status == 1 ? item.count : 0
							this.status3 += item.status == 0 ? item.count : 0
						})
					}
				}).catch((err) => {});
			},
			// 查看等多数据
			handleMore() {
				uni.navigateTo({
					url: "/pages_watch/healthMonitoring/uricAcidAbnormal?startTime="+this.queryParam.startTime+ "&endTime=" + this.queryParam.endTime
				})
			}
		},
		onPageScroll(e) {
			if (e.scrollTop <= 44) {
				this.opacity = e.scrollTop / 44 * 1
			} else if (e.scrollTop > 44) {
				this.opacity = 1
			}

		}
	}
</script>

<style lang="scss" scoped>
	@mixin u-flex($flexD, $alignI, $justifyC) {
		display: flex;
		flex-direction: $flexD;
		align-items: $alignI;
		justify-content: $justifyC;
	}

	.container {
		padding: 0 24rpx;
		position: relative;
	}

	.page-bg {
		width: 100%;
		height: auto;
		position: absolute;
		top: 0;
		left: 0;
	}

	.container-body {
		position: relative;
		z-index: 1;
		padding-bottom: 24rpx;
	}

	.box-title {
		font-family: PingFang SC, PingFang SC;
		font-weight: 400;
		font-size: 24rpx;
		color: #757575;
		@include u-flex(row, center, space-between);

		&-left {
			font-weight: 500;
			font-size: 36rpx;
			color: #222222;
			line-height: 42rpx;
		}

		&-right {
			@include u-flex(row, center, flex-start);

			image {
				height: 48rpx;
				width: 48rpx;
			}
		}
	}

	.ytitle {
		margin-top: 10rpx;
		line-height: 34rpx;
		margin-bottom: 24rpx;
		font-family: PingFang SC, PingFang SC;
		font-weight: 400;
		font-size: 24rpx;
		color: #999999;
	}

	.legend {
		height: 48rpx;
		margin-top: 44rpx;
		margin-bottom: 24rpx;
		@include u-flex(row, center, space-between);
		font-family: PingFang SC, PingFang SC;
		font-weight: 400;
		font-size: 24rpx;
		color: #757575;

		&-item {
			flex: 1;
			text-align: center;
			@include u-flex(row, center, center);
		}

		&-dot {
			width: 12rpx;
			height: 12rpx;
			border-radius: 50%;
			margin: 12rpx;
		}
	}

	.box {
		padding: 24rpx;
		margin-bottom: 20rpx;
		box-sizing: border-box;
		background: #FFFFFF;
		border-radius: 16rpx 16rpx 16rpx 16rpx;
	}

	.echartbox {
		height: 520rpx;
		width: 100%;
	}
	.abnormal {
		font-family: PingFang SC, PingFang SC;
		font-weight: 400;
		font-size: 24rpx;
		color: #757575;
		@include u-flex(row, center, flex-start);
		flex-wrap: wrap;
		// gap: 18rpx;
		margin-top: 20rpx;
		margin-bottom: -18rpx;
		margin-right: -18rpx;
		&-item {
			width: 206rpx;
			height: 144rpx;
			padding: 0 24rpx;
			margin: 0 18rpx 18rpx 0;
			box-sizing: border-box;
			border-radius: 16rpx 16rpx 16rpx 16rpx;
			border: 2rpx solid #FCF4F4;
			@include u-flex(column, flex-start, center);
	
			&-title {
				font-weight: 500;
				font-size: 32rpx;
				color: #333333;
				margin-bottom: 12rpx;
			}
	
			image {
				width: 24rpx;
				height: 24rpx;
			}
	
			&-num {
				width: 100%;
				@include u-flex(row, center, space-between);
			}
		}
	
		.colorbg1 {
			background: #FFFCFC;
			border-color: #FCF4F4;
		}
	
		.colorbg2 {
			background: #FEFAF8;
			border-color: #FDF7F3;
		}

		.colorbg3 {
			background: #FAFFFC;
			border-color: #EBFFF3;
		}
	}
	.standard {
		padding: 24rpx;
		margin-top: 32rpx;
		background: #F5F7FA;
		border-radius: 16rpx 16rpx 16rpx 16rpx;

		&-title {
			@include u-flex(row, center, flex-start);
			font-family: PingFang SC, PingFang SC;
			font-weight: 500;
			font-size: 28rpx;
			color: #333333;

			image {
				width: 48rpx;
				height: 48rpx;
				margin-right: 14rpx;
			}

			text:last-child {
				color: #FF7700;
			}
		}

		&-con {
			margin-top: 28rpx;
			font-family: PingFang SC, PingFang SC;
			font-weight: 400;
			font-size: 24rpx;
			color: #757575;

			view {
				margin-bottom: 12rpx;
				padding-left: 24rpx;
				position: relative;

				&::before {
					content: "";
					width: 8rpx;
					height: 8rpx;
					background: rgba(255, 119, 0, 0.5);
					border-radius: 50%;
					position: absolute;
					left: 0;
					top: 50%;
					transform: translateY(-50%);
				}
			}
		}
	}
</style>