-- company_role add is_admin
-- 0: no (default); 1: yes (created by admin platform)
ALTER TABLE company_role
    ADD COLUMN is_admin CHAR(1) NOT NULL DEFAULT '0' COMMENT '是否管理员设置（0否 1是，平台端新增为1）' AFTER del_flag;
